Title: Section Standards (Instructor ONLY)
Course: ATEP - MMT: Module A: > Section: PHASE 2 RESEARCH AND INVESTIGATE

Section Standards

1c. Review customer needs on a regular basis (MSSC, p. 12)

1d. Ensure customer specifications are up-to-date (MSSC, p. 12)

2a-f. Determine resources available for the production process (MSSC, p.12)