Title: Test and Evaluate Assignment
Course: ATEP - MMT: Module A: > Section: PHASE 6 TEST AND EVALUATE

Complete the Test and Evaluation template in the resource folder for your product.  Have your instructor review it and sign it prior to starting the testing procedures.