Title: Product Specifications Assignment
Course: ATEP - MMT: Module A: > Section: PHASE 1 CLARIFY THE PROBLEM: SPECIFICATIONS AND CONSTRAINTS

Create a product specification sheet for your product.  Use the sample outline shown in the lesson as a reference and then upload it here.