Title: Section Standards (Instructor ONLY)
Course: ATEP - MMT: Module A: > Section: WELCOME TO MODULE A - DESIGN FOR MANUFACTURING

- Section Standards

1. Identify the role of production workers in helping to ensure competitive levels of cost, quality and delivery in a safe work environment (MSSC, p. 3)
2. Communicate Quality Problems (MSSC, p. 8)
3. Understand quality systems such as Statistical Process Control (SPC) (MSSC, p. 10)

Teamwork Skills (MSSC, p.7)

1. Understand the characteristics of a high-performance team

2. Understand roles and responsibilities of production team members

3. Use teamwork to deal with customer requests

4. Align team goals to customer and business production needs

5. Ensure that team goals are specific, documented, measurable and achievable

6. Communicate production information to team members

7. Use team problem-solving and conflict resolution processes

Quality Documentation (MSSC, p. 11)

1. Complete proper forms to document problems and corrective action

2. Use computer systems to document and track substandard and scrapped parts, materials and assemblies as required by quality processes

3. Understand documentation process and requirements to ensure verifiable evidence of product quality