Title: Calculations and Measurements Exam#1
Course: BTEC-1100-301-302-303-F21 > Section: Module 1 - Calculations and Measurements

Note: This will be given as an in-class test.

1. Complete unit conversions.
2. Identify what a given metric system base unit measures.
3. Identify the decimal position of each metric system unit prefix.
4. Calculate solution concentrations in units of molarity, percentage, and grams per liter.
5. Measure volume and mass.
6. Make a solution at a given molarity, percentage, and grams per liter concentration.
7. Calculate the needed volume of a stock solution for a given working solution.
8. Dilute stock solutions to working solutions.
9. Dilute stock solutions into samples.
10. Measure a solution concentration using a spectrophotometer.
11. Perform serial dilutions.
12. Make a buffer at a given pH using a pH meter.

Objectives

- BTEC.1100.1 - Calculations and Measurements
- BTEC.1100.1.1
- BTEC.1100.1.2
- BTEC.1100.1.3
- BTEC.1100.1.4
- BTEC.1100.1.5
- BTEC.1100.1.6
- BTEC.1100.1.7
- BTEC.1100.1.8
- BTEC.1100.1.9
- BTEC.1100.1.10