Title: Scientific Notation: Practice Quiz #1
Course: BTEC-1100-301-302-303-F21 > Section: Module 1 - Calculations and Measurements

Q: Convert 0.00325 to scientific notation.
- 3.25 x 10^3
- 3.25 x 10^-3
- 3.25 x 10^4
- 3.25 x 10^-4 (Incorrect. Review the table of examples of scientific notation.)
A: 3.25 x 10^-3
If right: Correct!

Q: Convert 3174 to scientific notation.
- 3.174 x 10^3
- 3.174 x 10^-3
- 3.174 x 10^4
- 3.174 x 10^-4 (Incorrect. Review the table of examples of scientific notation.)
A: 3.174 x 10^3
If right: Correct!

Q: Convert 567925 to scientific notation.
- 5.67925 x 10^5
- 5.67925 x 10^-5
- 5.67925 x 10^4
- 5.67925 x 10^-4 (Incorrect. Review the table of examples of scientific notation.)
A: 5.67925 x 10^5
If right: Correct!

Q: Convert 3.65 x 10^-3 to standard notation.
- 0.00365
- 0.0365
- 3650
- 36500 (Incorrect. Review the table of examples of scientific notation.)
A: 0.00365
If right: Correct!