Title: Performance assessment - Safety and lab organization
Course: BTEC-1300-301-302-303-F21 > Section: The Manufacturing Environment

1. Log into SharePoint and collect the following documents if you do not have them
  1. Lab Organization Sheet - General Document
  2. Performance assessment - Safety and lab organization”
2. This Performance assessment contains the actual WID for manufacture of Cheek Cell DNA Extraction Kit that you will use in later modules.
3. The first few pages of the WID have several important sections that contain information about what is needed to make this product.
4. You should have a lab coat from prior semesters if you do not have one please see lab instructor
5. Using the lab organization sheet and the WID go into the lab and locate the storage location for each item in the Material, and Equipment sections listed in the WID.
6. For item that you will be asked to find there will be a 5-digit code located either under or near the item in question
7. Fill in the information on the table at the end on the performance assessment. The table includes space for the codes found on the materials and equipment, and if you have a coat and glasses. It also asks for the codes found on all safety equipment.
8. Once complete, scan and save the filled out document as a PDF file
9. Save the document with its name in the following format then submit it to Canvas
  1. Name of Performance assessment - Initials - Date (format DDMMMYYYY)
  2. Example: Performance assessment - Safety and lab organization - TD - 20JUN2018
10. It is important that document is named correctly and with the correct date in the correct date format!

Learning Objectives:

- 2.1 - Explain Lab safety procedures
- 2.2 - Describe how the lab is organized