Title: Labeling Sample Tubes
Course: BTEC-2000-301-302-303-F21 > Section: InnovaBio® Research Project

Proper labeling of sample tubes is a must when working with a team to promptly locate and identify needed samples. The label on a sample tube guides researchers to information regarding the sample. Because the cap on microcentrifuge tubes is very small the label must be clear and concise.

Before we standardized an InnovaBio® tube labeling format, we allowed students to choose a system that worked for them.  We realized it was mistake when we went to the box of a very good student who chose to label tubes with a system of colored dots. It took too much effort to decipher the system and find the desired tube. To prevent another fiasco we developed a system for all InnovaBio® interns to use when labeling tubes.

The exact tube label and specifications about the sample must also be written in the research notebook so the intern can correctly match the label on the tube with the description. The information typically consists of a detailed explanation about the origin and nature of the sample. With proper labeling, project groups can access samples at any given time regardless of who prepared the sample.

Read and use the labeling examples in:

InnovaBio Tube Labeling Guidelines revised.pdf

as you label tubes for your project activities.

Learning Objectives:

- 2.2 Make commonly used lab materials (e.g., solutions, plates, media) using the appropriate documents.
- 2.3 Demonstrate proficiency in basic research lab skills.