Title: InnovaBio® Project and Results Presentation
Course: BTEC-2000-301-302-303-F21 > Section: InnovaBio® Project Presentation

Welcome to the last module of your internship!  I hope it has been a good experience to learn science concepts and job skills. Please continue to do lab maintenance and conduct experiments as you have done in previous modules.  Your primary goal is to do the experimentation and data analysis according to your plan and design experiments according to the results. The module will introduce you to additional data analysis techniques and how to communicate your results with figures and tables.  At the end of this module you will present your project and the results of your experimentation.

In this module you will learn how to:

- Analyze data using standard curves,
- Make figures and tables of your results
- Prepare a presentation of your project data, results, and conclusions.