Title: BTEC-2000-301-302-303-F21

Getting Started
  Welcome
  Get to Know Your Course
  Learning and Technical Support
  Netiquette
  Scientific Method
  Introduce Yourself
  What Questions Do You Have? (optional)
Welcome to Your Biotechnology Experience
  Welcome to Your Biotechnology Experience
InnovaBio® Research Project
  Introduction to InnovaBio®
  InnovaBio® 100 Hours Log
  Choosing an InnovaBio® Project
  Selecting a Primary Paper
  Basic Flowchart Shapes
  Project Flowchart
  Project Flowchart Assignment
  Write an Abstract for Your Project
  Good Documentation Practices
  Labeling Sample Tubes
  Lab Notebook
  Annotated Project Flowchart
InnovaBio® Project Presentation
  InnovaBio® Project and Results Presentation
  Analyze Collected Data
  Excel Organization, Identification, and Calculation Syntax
  Calculations in Excel
  Calculating Standard Deviation in Excel
  Averaging Using Excel: Data entry
  Averaging Data
  Calculating Squares and Powers in Excel
  Calculating Division and Square Root in Excel
  Data Analysis Using Standard Curves
  Scatter Plot Line of Best-fit
  Non-Linear Standard Curve Exercise
  Use Excel to analyze data from your project
  Prepare Figures and Tables
  PowerPoint Presentation
  Project Poster
InnovaBio®
  Making Common Reagents-2