Title: Lab: Bradford Assay
Course: BTEC-2020-301-302-303-F21 > Section: Protein Gels

Module2 Bradford Assay

Lab

In this lab, you will be performing a Bradford assay on the same protein you used for your first SDS-PAGE gel.  Your goal is to determine the original concentration of the protein in the tube. Before starting, read the entire Bradford Assay Protocol, and ask an instructor about any questions you have. Good luck!

Bradford Assay Protocol