Title: Protocol, Material, and Equipment for a Eukaryotic Cell Transfection
Course: BTEC-2030-301-302-303-F21 > Section: Cell Culture

In order to observe cells using a fluorescent microscope, we will be growing cells in a 6-well plate as opposed to a flask. A T-flask is not suitable for use with the fluorescent microscope.

Learning Objectives:

- 1.6 - Transfect cells for fluorescence.
- 1.7 - Observe cells using a fluorescence microscope.