Title: Timers
Course: Renee-Faculty_Template_Jones-620-303-Motors_Ind_Electrical_Systems

Q: The contacts of an off-delay timer relay change from their normal state as soon as the timer coil energizes.
- True
- False
A: True

Q: The contacts of an on-delay timer relay change from their normal state as soon as the timer coil energizes.
- True
- False
A: False

Q: When the timer coil of an on-delay timer relay becomes de-energized, its contacts return to their normal state after the preset time has elapsed.
- True
- False
A: False

Q: When the timer coil of an on-delay timer relay becomes de-energized before the clock times out, the timer will reset to zero.
- True
- False
A: True

Q: The three main components of a time-delay relay are the coil, the contacts, and the power supply.
- True
- False
A: False