Title: GFCI
Course: Renee-Faculty_Template_Jones-620-303-Motors_Ind_Electrical_Systems

Q: The neutral and hot lead in a GFI travel through what kind of electronic device
- rectifier
- sensor
- solenoid
- capacitor
A: sensor

Q: GFCI stands for _________________________.
- Ground Fault Current Interrupter
- Ground Force Current Interface
- Ground Fault Circuit Interrupter
- Green Force Circuit Interface
A: Ground Fault Circuit Interrupter

Q: As of 2001 the number of deaths from electricution decreased to what with GFCI's in newly constructed homes
- 200
- 500
- 600
- 400
- 700
A: 400

Q: Before the introduction of the ground fault circuit interupters, how many people died from household electrocutions nationally each year?
- 500
- 400
- 700
- 600
A: 700

Q: If one of the conductors comes in contact with an grounded object
- a light will turn on
- gfci will open the circuit and stop the current flow
- gfci will redirect the current flow
- stand in water to reduce the shock
A: gfci will open the circuit and stop the current flow

Q: What causes a change in current when an individual pushes the test button on a Ground Fault Circuit Interrupter (GFCI)?
- Nothing at all changes the current.
- A resistor on a branch circuit.
- A 120 Volt load.
- Your finger making contact with the button.
A: A resistor on a branch circuit.

Q: What is activated when there is an induced voltage through the coil wrapped around the ring?
- circuit breaker mechanism
- resistor
- current
- ground
- GFCI
A: circuit breaker mechanism

Q: GFCI's are almost always in what room of the house?
- Bedroom
- Living room
- Bathroom
- Dining room
A: Bathroom