Title: Final lab build
Course: Renee-Faculty_Template_Jones-620-303-Motors_Ind_Electrical_Systems > Section: Assignments

For this test you will be given a ladder diagram and you will have to build it.  You will have 1 hour to build the ladder.  No friends, books or notes will be allowed. The topics of this test will include everything you have learned in the course.  This test will be worth 150 points.  The rubric is as follows:
5 points for each time I won't let you power up.
5 points each time the circuit doesn't work.
1 point for each minute you go over 1 hour time limit.
15 points for each question you ask after the 1 hour time frame.
15 points for each piece of equipment you chose wrong to use.
2 points for each wire you chose the wrong color.

You can get 5 points credit for each 10 minutes you complete the build prior to the 1 hour time frame.

Feel free to practice for this test prior to taking it.  I will answer any questions you like before the test.