Title: Reverse Rotation DC Motor
Course: Renee-Faculty_Template_Jones-620-303-Motors_Ind_Electrical_Systems

Q: If the power supply connections were reversed.
- it would rotate in reverse
- it will not change its rotation direction
- it will blow up
- it will not move
A: it will not change its rotation direction

Q: To change the relative direction of the lines of flux between armature and field coils,
- reverse the field windings
- reverse the armature windings
- both field windings and armature windings
- A or B, but not both
A: A or B, but not both

Q: To change the direction of motor you change what?
- Field windings
- Armature windings
- Field windings and armature windings
- A or B
A: A or B