Title: 4.10 Lab: Bracket
Course: 3D Modeling (Sandbox) > Section: Module 4: Basic Part Modeling - 16 Hours

Introduction

Refer back to tangent relations and symmetry. They are very important for this part.

Lab Instructions

Model the bracket.

BRACKET 3.PDF

The model should have a mass of 671.95 grams.

Hints: It's easier to do the vertical rib if the base extrusion's origin is in the center of the middle hole. Then you can use the origin as a reference for the 4.325" dimension of the rib. Pay attention to the material or you won't get the correct mass.

Submission

See rubric for submission and grading criteria.

Unless specified otherwise, any and all work on this page is licensed under a Creative Commons Attribution-NonCommercial 4.0 International License.