Title: 4.9 Lab: Connecting Rod
Course: 3D Modeling (Sandbox) > Section: Module 4: Basic Part Modeling - 16 Hours

Introduction

The connecting rod is similar to the tube hanger. There's just a little more to it, as you can see from the pictures below.

Lab Instructions

Model the the connecting rod.

Connecting Rod.PDF

Hint: 7075 is an Aluminum alloy.

The model should have a surface area of 21.88 in^2. The .350 OFFSET callout applies all the way around to every edge, including the curves on the top and bottom.

Submission

See rubric for submission and grading criteria.

Unless specified otherwise, any and all work on this page is licensed under a Creative Commons Attribution-NonCommercial 4.0 International License.