Title: Module 1: Codes and Standards
Course: Basic Electrical Theory and Wiring (Sandbox) > Section: Module 1: Electrical Safety

Codes and Standards

When doing wiring, we should use codes, standards, and references. Textbooks and other references cannot be used for design or for knowing how to properly wire things. Always refer to the national or local code.

The following texts are the codes and standards that you are required to follow when doing electrical work. Pay attention to when we can and should use each.

NFPA 70 | The NFPA 70 National Electrical Code (NEC) is the national code to be applied to all electrical work. It contains the national rules for housing, motor, circuit breakers, and overload protection. As new editions are released, always use the most recent publication. Be sure to reference the applicable national and local codes and standards as you design and complete your electrical work.
NEC Pocket Guide | This pocket guide is a quick reference to consult when reviewing electrical code and standards. You should only use this as a reference as the NEC has the most up to date regulations.
Ugly's Electrical Reference | Ugly's Electrical Reference is, like the title suggests, a great electrical reference. It should not be used as code or in place of NEC, but it can be used to help wire or understand electrical schematics.

Unless specified otherwise, any and all work on this page is licensed under a Creative Commons Attribution-NonCommercial 4.0 International License.