Title: Lab 4-1 Quiz: AC Current Measurement - 45 Minutes
Course: Basic Electrical Theory and Wiring (Sandbox) > Section: Module 4: Current

Q: Did you land the black wire from the 15 A circuit breaker to the brass screw on the light bulb?
- Yes
- No
A: Yes

Q: Did you connect a white wire to the silver screw of the light bulb back to the ground bar?
- Yes
- No
A: Yes

Q: What Amps did you measure with the Extech?

Q: Did you wear your safety glasses?
- Yes
- No
A: Yes

Q: Did you lockout and tagout your power supply after the lab was compelete?
- Yes
- No
A: Yes

Q: Did you verify with a multimeter that the voltage was at 0V or near 0V after you performed lockout/tagout?
- Yes
- No
A: Yes