Title: DWG Legend
Course: Basic Electrical Theory and Wiring (Sandbox) > Section: Module 10: Series Circuits

Introduction

You have had experience throughout this course wiring circuits according to schematics. Now, you will have a chance to create the schematics yourself.

Use the following legend in your work. This will be good to refer back to as needed. You may want to print a copy to use while doing Module 11 and Module 12 labs: AMAR-1200-00 R1- Legend.pdf

Unless specified otherwise, any and all work on this page is licensed under a Creative Commons Attribution-NonCommercial 4.0 International License.