Title: Quiz 5-6: Series Resistors - 1.5 Hour
Course: Basic Electrical Theory and Wiring (Sandbox) > Section: Module 5: Resistance

Q: Select the correct total resistance found of the circuit below.

(Answers must be in Ωs. For instance, 2K should be recorded as 2000.)
- Infinity (or No Connection)
- 0
- 1
- 630
A: Infinity (or No Connection)

Q: 1. Connect each circuit shown below. Instead of a power source, use two male/mall jumper wires in place.
2. Measure the resistance across the jumper wires which should be simulating the + and - terminals of the power supply shown in each circuit. Record the value that you measured below. (If you do not get a numeric answer, include the correct answer from the list: "Little to no resistance", "Infinity", or "There is no resistance").

(Answers must be in Ωs. For instance, 2K should be recorded as 2000).
- Infinity (or No Connection)
- 1
- 0
- 630
A: Infinity (or No Connection)

Q: Refer to the image below. In order to have a total resistance of 820 ohms, determine the correct resistor for R1 and R2 to equal 820Ω. Select the two resistors from the list that satisfy this criteria.

(Answers must be in Ωs. For instance, 2K should be recorded as 2000.)
- 240Ω
- 270Ω
- 390Ω
- 430Ω
- 470Ω
- 560Ω
- 680Ω
- 750Ω
- 1KΩ
- 4.7KΩ
A: 390Ω; 430Ω

Q: Briefly discuss any differences you found between the calculated and measured values you recorded. Why do you think you encountered these differences?