Title: Lab 3-2 Quiz: DC Voltage Measurement - 1 Hour
Course: Basic Electrical Theory and Wiring (Sandbox) > Section: Module 3: Voltage

Q: What voltage did you measure across the DC power supply?

Q: What voltage did you measure across the DC power supply when you swapped the leads?

Q: What does the value that you got from swapping the leads tell you about DC?

Q: Did you wear your safety glasses during the entire lab?
- Yes
- No
A: Yes

Q: Did you lockout and tagout your power after the lab was complete?
- Yes
- No
A: Yes

Q: Did you verify with a multimeter that the voltage was at 0V or near 0V after you performed lockout/tagout?
- Yes
- No
A: Yes