Title: Lab 4-2 Quiz: DC Current Measurement - 45 Minutes
Course: Basic Electrical Theory and Wiring (Sandbox) > Section: Module 4: Current

Q: Did you wire the red wire from the fan to the DC V+?
- Yes
- NO
A: Yes

Q: Did you wire the black wire from the fan to the DC V-?
- Yes
- No
A: Yes

Q: What amps did you measure with the Extech?

Q: Did you wear your safety glasses during the entire lab?
- Yes
- No
A: Yes

Q: Did you lockout and tagout your power after the lab was complete?
- Yes
- No
A: Yes

Q: Did you verify with a multimeter that the voltage was at 0V or near 0V after you performed lockout/tagout?
- Yes
- No
A: Yes