Title: Module 8: Power Videos
Course: Basic Electrical Theory and Wiring (Sandbox) > Section: Module 8: Power

Introduction

How many people does it take to turn on a light? Well, let's find out by learning about power and different forms of energy cells.

Power will be the central topic for much of this module. A firm understanding on what power is, its relationship with amps and voltage, and how to properly calculate power will be required throughout quizzes and labs moving forward.

Unless specified otherwise, any and all work on this page is licensed under a Creative Commons Attribution-NonCommercial 4.0 International License.