Title: Lab 12-1: Troubleshooting - 7 Hours
Course: Basic Electrical Theory and Wiring (Sandbox) > Section: Module 12: Troubleshooting

Introduction

You have learned about electricity and how to wire things up in the previous labs. Now we will take what you have learned and apply it to troubleshooting an electrical circuit. We will be using simulation software (Simutech) to simulate a circuit that has a problem in it.

Watch the video to learn how to troubleshoot the circuit. Then, open the software and begin troubleshooting.

 | Note! |
After the video, you may start right into the troubleshooting.

If need be, there are practice examples that you can do before starting the actual challenges.

Instructions

1. Open Simutech Troubleshooting Electrical Circuits.

 | Location |
 | Use the local desktop or use VMWare. Search for a Simutech folder or Simutech desktop icon. |

2. Complete all 6 Basic Troubleshooting challenges.

Submission

What to Submit

Submit a photo per the rubric below.

 | Note! |
 | Write your name on a piece of paper and include it in the photo. |

How to Submit

Click here for step-by-step instructions on how to submit photo submissions.

Unless specified otherwise, any and all work on this page is licensed under a Creative Commons Attribution-NonCommercial 4.0 International License.