Title: Module 7: Hours Submission
Course: Basic Electrical Theory and Wiring (Sandbox) > Section: Module 7: Ohm's Law

Q: Approximately how many hours total have you spent on this module?
- <5 hours
- 5-6 hours
- 6-7 hours
- 7-8 hours
- 8> hours
A: 6-7 hours

Q: Were there any labs or quizzes that took longer or shorter than what was listed? If so, which one and why do you think it was shorter/longer than anticipated?

Q: What did you consider to be your biggest challenge in this section?