Title: Module 1: Intro to Trainer Video
Course: Basic Electrical Theory and Wiring (Sandbox) > Section: Module 1: Electrical Safety

Introduction

You will be doing a lot of work in the trainers. Watch the videos below to gain an understanding of the trainers.

Unless specified otherwise, any and all work on this page is licensed under a Creative Commons Attribution-NonCommercial 4.0 International License.