Title: Module 9: Hours Submission
Course: Basic Electrical Theory and Wiring (Sandbox) > Section: Module 9: Relays

Q: Approximately how many hours total have you spent on this module?
- <0.5 hours
- 0.5 - 1 hours
- 1-2 hours
- 2-3 hours
- >4 hours
A: 1-2 hours

Q: Were there any labs or quizzes that took longer or shorter than what was listed? If so, which one and why do you think it was shorter/longer than anticipated?

Q: What did you consider to be your biggest challenge in this section?