Title: Component List
Course: Basic Electrical Theory and Wiring (Sandbox) > Section: Start Here

Below is a list of components used in this class. Click on the link for additional information. These components and their links will also be listed in your labs.

ID | Item | Image | Qty for Kit | In Kit 2290039
1 | Circuit Breaker Box (Note: Ours doesn't have the cover.) |  | 1 |
2 | 15-Amp, 2-Way Light Switch |  | 2 |
3 | 15-Amp, 3-Way Light Switch |  | 2 |
4 | 15-Amp, 4-Way Light Switch |  | 1 |
5 | 15-Amp, 125 V Receptacle (Outlet) |  | 2 |
6 | Light Socket |  | 2 |
7 | Buzzer |  | 1 |
8 | 50-Amp, 240 V Receptacle (Outlet) |  | 1 |
9 | 15-Amp, Single-Pole Circuit Breaker |  | 1 |
10 | 20-Amp, Single-Pole Circuit Breaker |  | 1 |
11 | 30-Amp, Double-Pole Circuit Breaker |  | 1 |
12 | Blue Gang Box |  | 7 |
13 | Multimeter (Greenlee) |  | 1 |
14 | Multimeter (Extec) |  | 1 |
15 | 4-in-1 Screwdriver |  | 1 |
16 | 3 mm x 100 mm Screwdriver |  | 1 |
17 | Wire Strippers |  | 1 |
18 | 12 V Light Bulb (25W) |  | 3 |
19 | DIN Rail Clips |  | 10 |
20a | 50 VA Control Transformer (This option may be used.) |  | 1 |
20b | 40 VA Control Transformer (This option may be used.) |  | 1 |
21 | 3-Amp, Double-Pole Circuit Breaker |  | 1 |
22 | 24 VDC Power Supply |  | 1 |
23 | Push Button (Breadboard) |  | 1 | X
24 | 24 VDC Fan |  | 1 | X
25 | 1.9" x 1.3" Breadboard |  | 1 | X
26 | Male-Female Jumper Wires |  | 1 | X
27 | Male-Male Jumper Wires |  | 1 | X
28 | Female-Female Jumper Wires |  | 1 | X
29 | 12 VDC Solenoid |  | 1 | X
30 | Red LED |  | 6 | X
31 | 50 Î© 5 W Resistor |  | 2 |
32 | 240 Î© 1/4 W Resistor |  | 10 | X
33 | 270 Î© 1/4 W Resistor |  | 10 | X
34 | 390 Î© 1/4 W Resistor |  | 10 | X
35 | 430 Î© 1/4 W Resistor |  | 10 | X
36 | 470 Î© 1/4 W Resistor |  | 10 | X
37 | 560 Î© 1/4 W Resistor |  | 10 | X
38 | 680 Î© 1/4 W Resistor |  | 10 | X
39 | 750 Î© 1/4 W Resistor |  | 10 | X
40 | 1K Î© 1/4 W Resistor |  | 10 | X
41 | 4.7K Î© 1/4 W Resistor |  | 10 | X
42 | SPDT Switch (Breadboard) |  | 1 | X
43 | 24 VDC SPDT Relay |  | 1 |
44 | 8-Pin Relay Socket |  | 1 |
45 | Romex 14/2 |  | 25 Feet |
46 | Romex 14/3 |  | 25 Feet |
47 | Romex 12/2 |  | 25 Feet |
48 | Romex 10/3 |  | 25 Feet |
49 | 18 AWG Black Wire |  | 250 Feet |
50 | 18 AWG Red Wire |  | 250 Feet |
51 | 18 AWG White Wire |  | 250 Feet |
52 | 18 AWG Green Wire |  | 250 Feet |
53 | 22 AWG Blue Wire |  | 250 Feet |
54 | 22 AWG Brown Wire |  | 250 Feet |

Unless specified otherwise, any and all work on this page is licensed under a Creative Commons Attribution-NonCommercial 4.0 International License.