Title: Lab 5-5 Quiz: Measure Resistance Across a DC Load - 30 Minutes
Course: Basic Electrical Theory and Wiring (Sandbox) > Section: Module 5: Resistance

Q: What is the measured resistance across the DC solenoid?

Q: What is the measured resistance across the 24VDC relay coil?

Q: Did you wear your safety glasses during the lab?
- Yes
- No
A: Yes