Title: Module 2: Hours Submission
Course: Basic Electrical Theory and Wiring (Sandbox) > Section: Module 2: Wiring

Q: Approximately how many hours total have you spent on this module?
- <1 hours
- 1-2 hours
- 2-3 hours
- 3 - 4 hours
- > 4 hours
A: 2-3 hours

Q: Were there any labs or quizzes that took longer or shorter than what was listed? If so, which one and why do you think it was shorter/longer than anticipated?

Q: What did you consider to be your biggest challenge in this section?