Title: Facilitator Help Page: Quiz 5-6 -- (Do Not Publish)
Course: Basic Electrical Theory and Wiring (Sandbox) > Section: Module 5: Resistance

Quiz 5-6 Answers

1. \(R_{Tot}=4700Ω\)
  1. Note: some students may want to put 4.7 kΩ, but the answer asks for Ω.
  2. The student should measure between 4465 and 4935 Ω.
2. \(R_{Tot}=\:240\:+\:680\:=\:920Ω\)
  1. The student should measure between 874 and 966 Ω
3. There is infinite resistance between these 2 resistors.
  1. There is infinite resistance between these 2 resistors.
4. R1 and R2 should be 390 and 430Ω to get a total of 820 Ω
  1. The student should measure between 779 and 861 Ω.
5. There will be differences. Most often, the measured value is lower. Also, each resistor has a tolerance. Most of ours are + or - 5%.

Unless specified otherwise, any and all work on this page is licensed under a Creative Commons Attribution-NonCommercial 4.0 International License.