Title: Module 8: Hours Submission
Course: Basic Electrical Theory and Wiring (Sandbox) > Section: Module 8: Power

Q: Approximately how many hours total have you spent on this module?
- <3 hours
- 3-4 hours
- 4-5 hours
- 5-6 hours
- >6 hours
A: 4-5 hours

Q: Were there any labs or quizzes that took longer or shorter than what was listed? If so, which one and why do you think it was shorter/longer than anticipated?

Q: What did you consider to be your biggest challenge in this section?