Title: Module 13: Hours Submission
Course: Basic Electrical Theory and Wiring (Sandbox) > Section: Module 13: Conduit

Q: Approximately how many hours total have you spent on this module?
- <2 hours
- 2-3 hours
- 3-4 hours
- 4-5 hours
- 6> hours
A: 3-4 hours

Q: Were there any labs or quizzes that took longer or shorter than what was listed? If so, which one and why do you think it was shorter/longer than anticipated?

Q: What did you consider to be your biggest challenge in this section?