Title: Lab 5-4 Quiz: Light Bulbs in Series - 30 Minutes
Course: Basic Electrical Theory and Wiring (Sandbox) > Section: Module 5: Resistance

Q: What was your calculated total resistance value?

Q: What was your measured total resistance value?

Q: Where the measured and calculated the same? If not, why do you think that they were different?

Q: Did you wear your safety glasses during the lab?
- Yes
- No
A: Yes