Title: NSF Attribution
Course: Electrical Motor Controls (Sandbox) > Section: Orientation, 1 hr

The development of this course was supported through the "Scaling Up Utah's Automated Manufacturing Technician Pipeline" National Science Foundation grant (#1801154).

You can learn more at https://atecentral.net/msites/SUUAMTP