Title: Assignment: Trainer Lab #7 Schematic in Automation Studio
Course: Fluid Power Pneumatics (Sandbox) > Section: Module 5: Breaking Down a Pneumatic System / Work Side - 10 Hours

Introduction

You will use Automation Studio for this assignment.

Assignment

Create a schematic for Trainer Lab #7. Make it similar to the schematic that is included with Trainer Lab #7.

Submission

Submit a video of the simulation of your schematic. Show your face and state your name in the video.

Unless specified otherwise, any and all work on this page is licensed under a Creative Commons Attribution-NonCommercial 4.0 International License.