Title: Quiz: Calculate Force of a Retracting Cylinder
Course: Fluid Power Pneumatics (Sandbox) > Section: Module 6: The Principle of Pneumatic Pressure and Force - 2 Hours

Q: Calculate the total force of the retracting cylinder with the following parameters:

- Pressure = 110 psi
- Cylinder Diameter = 3"
- Rod Diameter = 1"
- 650.20
- 690.20
- 700.23
- 300.20
A: 690.20

Q: Calculate the total force of the retracting cylinder with the following parameters:

- Pressure = 75 psi
- Cylinder Diameter = 4"
- Rod Diameter = 1.5"
- 108
- 810
- 380
- 1800
A: 810

Q: Calculate the total force of the retracting cylinder with the following parameters:

Pressure = 95 psi

Cylinder Diameter = 1.5"

Rod Diameter = .125"
- 106.66
- 300.66
- 166.06
- 146
A: 166.06