Title: 3-axis Machine Setup Quiz
Course: Multi-Axis Machining Operations (ATE CENTRAL) > Section: Day 2 - 5 Hours (Total: 10 Hours)

Q: An end mill should not rotate while probing for a length offset?
- True
- False
A: False

Q: Number of flutes do not have to be specified before probing for a length offset.
- True
- False
A: True

Q: The WIPS system includes 3 key components. What are they?

Select all that apply.
- Optical Machine Interface
- Optical Tool Sensor
- Optical Part Probe
- Optical Machine Probe
- Optical Table Probe
A: Optical Machine Interface; Optical Tool Sensor; Optical Machine Probe

Q: What will happen if you are probing in Z and the probe tip doesn't contact the part within the given Z value?
- The machine will emergency stop.
- The machine will retract in Z and give an alarm.
- Machine will return to its home position
A: The machine will retract in Z and give an alarm.

Q: When squaring a vice, is it a good idea to only put one bolt in place to hold the vice to the table while you indicate?
- True
- False
A: True