Title: Machine Identification
Course: Multi-Axis Machining Operations (ATE CENTRAL) > Section: Day 1 - 5 Hours (Total: 5 Hours)

#ICON#

INTRODUCTION

The HAAS UMC-500 is the 5-axis machine that is located in the BTECH machine shop. You should be familiar with the machine and the most relevant parts.

Use the following diagrams as a guide.

HAAS UMC-500 Machine

HAAS UMC-500 Control Panel

HAAS UMC-500 Display Panel

Unless specified otherwise, any and all work on this page is licensed under a Creative Commons Attribution-NonCommercial 4.0 International License.